
\begin{frame}{Backgrounds (Reducible)}
  \begin{center}
    \includegraphics[width=0.8\textwidth]{figures/reducible-backgrounds}
  \\
  Here, $\epsilon=10^{-4}$, but will need to be corrected to measured value for CMS
  \end{center}
\end{frame}
