
\begin{frame}{Previous CMS Measurements @ 13TeV}
\begin{table}[]
  \begin{tabular}{@{}lcr@{}}
  \textbf{Analysis}           & \textbf{Channel}            & \textbf{Limit}  \\ \midrule
  CMS-TOP-16-016              & Single Lepton, OS Dilepton  & 94\fb          \\ \midrule%
  CMS-SUS-15-008              & SS Dilepton                 & 119\fb         \\ \bottomrule%
  \textbf{Combined}           &                             & 69\fb          \\%
  \end{tabular}
\end{table}
\end{frame}
