
% rubber: module pdftex

\documentclass[english,aspectratio=169]{beamer}
\usepackage{graphicx}
\usepackage{amssymb}
\usepackage{booktabs}
\usepackage{siunitx}
\usepackage{subcaption}
\usepackage{marvosym}
\usepackage[space]{grffile} % allows for spaces in filenames in \includegraphics

\newcommand{\pb}{\si{\pico\barn}}%
\newcommand{\fb}{\si{\femto\barn}}%
\newcommand{\invfb}{\si{\per\femto\barn}}

\newcommand{\GeV}{\si{\giga\electronvolt}}

\newcommand{\specialcell}[2][c]{%
  \begin{tabular}[#1]{@{}c@{}}#2\end{tabular}}

\newcommand{\beginbackup}{%
   \newcounter{framenumbervorappendix}
   \setcounter{framenumbervorappendix}{\value{framenumber}}
}
\newcommand{\endbackup}{%
   \addtocounter{framenumbervorappendix}{-\value{framenumber}}
   \addtocounter{framenumber}{\value{framenumbervorappendix}}
}

\usetheme[]{bjeldbak}

\begin{document}

\title[4t X-Section]{Four Tops X Section Measurement}
\subtitle{Trilepton Channel ($\mu^+\mu^-e, e^+e^-\mu$) }
\author[C. Fangmeier]{Caleb Fangmeier}
\institute[UNL]{University of Nebraska \-- Lincoln}
\date{\today}

\titlegraphic{%
\begin{figure}
  \includegraphics[width=1in]{CMSlogo.png}\hspace{0.75in}\includegraphics[width=1in]{nebraska-n.png}
\end{figure}
}

\begin{frame}[noframenumbering,plain]
  \titlepage%
\end{frame}

\section{Introduction}
\input{slides/introduction.tex}
\input{slides/decay_channels_rates.tex}




\section{Strategy}
\input{slides/strategy.tex}
\input{slides/irreducible_backgrounds.tex}
\input{slides/reducible_backgrounds.tex}



\section{Some Preliminary Plots}
\input{slides/progress_and_status.tex}
\input{slides/prelim_plots.tex}

\section{Timeline}
\input{slides/timeline.tex}

\input{slides/references.tex}

\beginbackup%
\section{Backups}

\begin{frame}
  \huge
  \centering
  Backups
\end{frame}

\input{slides/production.tex}
\input{slides/decay_channels.tex}
\input{slides/previous_measurements.tex}

\endbackup%

\end{document}
